ASSERT_EQ_FN_DEF(uint8_t, "hhu", "hhx")
ASSERT_EQ_FN_DEF(uint16_t, "hu", "hx")
ASSERT_EQ_FN_DEF(uint32_t, "u", "x")
ASSERT_EQ_FN_DEF(uint64_t, PRIu64, PRIx64)
